-- Remove circuit breaker settings from admin_settings
DELETE FROM admin_settings 
WHERE setting_key IN (
  'circuit_breaker.failure_threshold',
  'circuit_breaker.reset_timeout', 
  'circuit_breaker.monitoring_window'
);