-- Fix security warnings by setting search_path for functions
ALTER FUNCTION public.update_park_ratings(UUID) SET search_path = public;
ALTER FUNCTION public.update_ride_ratings(UUID) SET search_path = public;  
ALTER FUNCTION public.update_company_ratings(UUID) SET search_path = public;
ALTER FUNCTION public.update_all_ratings_for_review() SET search_path = public;