-- Add Novu configuration settings to admin_settings
INSERT INTO admin_settings (setting_key, category, setting_value, description)
VALUES 
  ('novu.application_identifier', 'integrations', '""', 'Novu Cloud Application Identifier for in-app notifications')
ON CONFLICT (setting_key) DO NOTHING;