-- Add CAPTCHA bypass setting to admin_settings
INSERT INTO public.admin_settings (setting_key, setting_value, category, description)
VALUES (
  'auth.captcha_bypass_enabled',
  'false',
  'auth',
  'Allow CAPTCHA bypass for authentication (development only - requires VITE_ALLOW_CAPTCHA_BYPASS=true in environment)'
)
ON CONFLICT (setting_key) DO NOTHING;