-- Remove the CAPTCHA bypass setting from admin_settings
-- This setting is now controlled exclusively via VITE_ALLOW_CAPTCHA_BYPASS environment variable
DELETE FROM public.admin_settings 
WHERE setting_key = 'auth.captcha_bypass_enabled';